DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 13–153 arXiv:1312.2523 December 2013

Precise Calculation of the Dilepton Invariant-Mass Spectrum and the Decay Rate in B^± → π^±μ^+μ^− in the SM

A. Ali

Deutsches Elektronen-Synchrotron DESY, Hamburg

A. Ya. Parkhomenko, A. V. Rusov

Department of Theoretical Physics, P.G. Demidov Yaroslavl State University, Yaroslavl, Russia

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG