DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 13–155 arXiv:1309.0529 September 2013

Accidental Inflation from Kähler Uplifting

I. Ben-Dayan, A. Westphal, C. Wieck

Deutsches Elektronen-Synchrotron DESY, Hamburg

S. Jing

Canadian Institute for Theoretical Astrophysics, University of Toronto, Canada and Department of Astronomy and Astrophysics, University of Toronto, Canada

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG