DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 13–168 UWThPh-2013-23 arXiv:1309.6323 September 2013

The Top-Antitop Threshold at the ILC:

NNLL QCD Uncertainties

A. H. Hoang

Fakultät für Physik, Universität Wien, Austria

M. Stahlhofen

Deutsches Elektronen-Synchrotron DESY, Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG