DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 13–172 arXiv:1309.6114 September 2013

Constraining ALPs with Linear and Circular Polarisation Measurements of Quasar Light

A. Payez

IFPA Group, AGO Department, University of Liège, Belgium and Deutsches Elektronen-Synchrotron DESY, Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG