DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 13–175 arXiv:1310.5709 October 2013

Integrability in N = 2 Superconformal Gauge Theories

E. Pomoni

Deutsches Elektronen-Synchrotron DESY, Hamburg and Physics Division, National Technical University of Athens, Greece

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG