DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 13–180 HIP-2013-21/TH arXiv:1310.1374 October 2013

The Minimal Curvaton-Higgs Model

K. Enqvist

Physics Department, University of Helsinki and Helsinki Institute of Physics, Finland

R. N. Lerner

Physics Department, University of Helsinki and Helsinki Institute of Physics, Finland and Deutsches Elektronen-Synchrotron DESY, Hamburg

T. Takahashi

Department of Physics, Saga University, Saga, Japan

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG