DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 13–186 IPPP/13/88 MCnet-13-15 DCPT/13/176 KA-TP-31-2013 ZU-TH 23/13 arXiv:1310.6877 October 2013

Herwig++ 2.7 Release Note

J. Bellm, S. Giseke, C. Röhr, T. Schuh, B. Zimmermann

Institut für Theoretische Physik, Karlsruher Institut für Technologie

D. Grellscheid, P. Richardson, A. Wilcock

IPPP, Department of Physics, University of Durham, UK

A. Papaefstathiou

Institut für Theoretische Physik, Universität Zürich, Switzerland

S. Plätzer

Deutsches Elektronen-Synchrotron DESY, Hamburg

M. H. Seymour, A. Siódmok

School of Physics and Astronomy, University of Manchester, UK

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG