DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 13–191 HU-EP-13/54 SFB/CPP-13-77 arXiv:1311.7304 November 2013

Critical Slowing Down and the Gradient Flow Coupling in the Schrödinger Functional

P. Fritzsch, F. Stollenwerk

Institut für Physik, Humboldt-Universität, Berlin

A. Ramos

John von Neumann-Institut für Computing NIC/DESY, Zeuthen

ISSN 0418-9833

PLATANENALLEE 6 - 15738 ZEUTHEN