DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 13–211 arXiv:1312.4821 December 2013

Measurement of Inclusive ep Cross Sections at High Q^2 at √ s = 225 and 252 GeV and of the Longitudinal Proton Structure Function F_L at HERA

H1 Collaboration

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG