DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 13–230 arXiv:1311.6752 November 2013

The Role of Plasma Instabilities in the Propagation of Gamma-Rays from Distant Blazars

A. Saveliev, C. Evoli, G. Sigl

II. Institut für Theoretische Physik, Universität Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG