DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 13–258 IPPP/13/103 DCPT/13/206 KCL-PH-TH/2013-48 arXiv:1312.5720 December 2013

Sharpening m_{T 2} Cusps: The Mass Determination of Semi-Invisibly Decaying Particles

from a Resonance

L. A. Harland-Lang

Department of Physics and Institute for Particle Physics Phenomenology, University of Durham, UK

C.-H. Kom

Department of Mathematical Sciences, University of Liverpool, UK

K. Sakurai

Theoretical Particle Physics and Cosmology Group, Department of Physics, King’s College London, UK

M. Tonini

Deutsches Elektronen-Synchrotron DESY, Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG