DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 13–261 arXiv:1312.7875 December 2013

Transverse Momentum Dependent Gluon Density from DIS Precision Data

F. Hautmann

Department of Physics and Astronomy, University of Sussex, Brighton, UK and Rutherford Appleton Laboratory, Chilton, Didcot, Oxon, UK and Department of Theoretical Physics, University of Oxford, UK

H. Jung

Deutsches Elektronen-Synchrotron DESY, Hamburg and Elementaire Deeltjes Fysica, Universiteit Antwerpen, Belgium

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG