DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 14–006 arXiv:1401.1844 January 2014

Two-Loop Electroweak Threshold Corrections to the Bottom and Top Yukawa Couplings

B. A. Kniehl, O. L. Veretin

II. Institut für Theoretische Physik, Universität Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG