DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 14–008 MIT-CTP 4530 NIKHEF 2014-002 arXiv:1405.6722 May 2014

Dissecting Soft Radiation with Factorization

I. W. Stewart

Center for Theoretical Physics, Massachusetts Institute of Technology, Cambridge, USA

F. J. Tackmann

Deutsches Elektronen-Synchrotron DESY, Hamburg

W. J. Waalewijn

Nikhef, Amsterdam, The Netherlands and ITFA, University of Amsterdam, The Netherlands

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG