DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 14–015 arXiv:1402.3176 February 2014

Quantifying the ‘Naturalness’ of the Curvaton Model

R. N. Lerner

Deutsches Elektronen-Synchrotron DESY, Hamburg and Helsinki Institute of Physics, Finland

S. Melville

Helsinki Institute of Physics, Finland

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG