DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 14–053 April 2014

Deep Inelastic Cross-Section Measurements at Large y with the ZEUS Detector at HERA

ZEUS Collaboration

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG