DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 14–061 MPP-2014-145 arXiv:1404.7096 May 2014

GoSam-2.0:

A Tool for Automated One-Loop Calculations within the Standard Model and Beyond

G. Cullen et al.

ISSN 0418-9833

PLATANENALLEE 6 - 15738 ZEUTHEN