DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 14–082 arXiv:1405.5068 May 2014

Measurement of D^∗ Photoproduction at Three Different Centre-of-Mass Energies at HERA

ZEUS Collaboration

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG