DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 14–095 arXiv:1406.7013 December 2014

Precise Predictions for B → X_cτ ν̄ Decay Distributions

Z. Ligeti

Ernest Orlando Lawrence Berkeley National Laboratory, University of California, Berkeley, USA

F. J. Tackmann

Deutsches Elektronen-Synchrotron DESY, Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG