DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 14–104 PSI-PR-14-04 ZU-TH 21/14 arXiv:1407.2532 July 2014

Renormalization-Group Improved Fully Differential Cross Sections for Top Pair Production

A. Broggio

Paul Scherrer Institut, Villigen PSI, Switzerland

A. S. Papanastasiov

Deutsches Elektronen-Synchrotron DESY, Hamburg

A. Signer

Paul Scherrer Institut, Villigen PSI, Switzerland and Physik Institut, Universität Zürich, Switzerland

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG