DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 14–165 arXiv:1409.6992 September 2014

First Sensitivity Limits of the ALPS TES Detector

J. Dreyling-Eschweiler, for the ALPS-II Collaboration

Deutsches Elektronen-Synchrotron DESY, Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG