DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 14–177 MPP-2014-371 arXiv:1410.6099 October 2014

Model-Independent Production of a Top-Philic Resonance at the LHC

N. Greiner

Deutsches Elektronen-Synchrotron DESY, Hamburg and Max-Planck-Institut für Physik, München

K. Kong

Department of Physics and Astronomy, University of Kansas, Lawrence, USA

J.-C. Park

Department of Physics and Astronomy, University of Kansas, Lawrence, USA and Department of Physics, Sungkyunkwan University, Suwon, Korea

S. C. Park

Department of Physics, Sungkyunkwan University, Suwon, Korea and School of Physics, Korea Institute for Advanced Study, Seoul, Korea

J.-C. Winter

Max-Planck-Institut für Physik, München

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG