DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 14–183 arXiv:1410.3237 October 2014

GoSam 2.0: Automated One Loop Calculations within and beyond the Standard Model

N. Greiner

Max-Planck-Institut für Physik, München and Deutsches Elektronen-Synchrotron DESY, Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG