DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 14–239 arXiv:1501.00899 December 2014

Statistical Properties of the Radiation from SASE FEL Operating in a Post-Saturation Regime with and without Undulator Tapering

E. A. Schneidmiller, M. V. Yurkov

Deutsches Elektronen-Synchrotron DESY, Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG