DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 15–001 arXiv:1501.00784 January 2015

Improved Estimates of the B_{(s)} → V V Decays in Perturbative QCD Approach

Z.-T. Zou, Y. Li

Department of Physics, Yantai University, China

A. Ali

Deutsches Elektronen-Synchrotron DESY, Hamburg

C.-D. Lü

Institute of High Energy Physics and Theoretical Physics Center for Science Facilities, CAS, Beijing, China

X. Liu

School of Physics and Electronic Engineering, Jiangsu Normal University, Xuzhou, China

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG