DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 15–009 arXiv:1501.0345 January 2015

Accurate and Efficient Spin Integration for Particle Accelerators

D. T. Abell, D. Meiser

Tech-X Corporation, Boulder, Colorado, USA

V. H. Ranjbar

Brookhaven National Laboratory, Upton, New York, USA

D. P. Barber

Deutsches Elektronen-Synchrotron DESY, Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG