DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 15–039 arXiv:1506.06042 June 2015

Combination of Measurements of Inclusive Deep Inelastic e^±p Scattering Cross Sections and QCD Analysis of HERA Data

H1 and ZEUS Collaborations

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG