DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 15-042 arXiv:1503.07883 March 2015

Spectral Zeta Function and Non-Perturbative Effects in ABJM Fermi-Gas

Y. Hatsuda

Deutsches Elektronen-Synchrotron DESY, Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG