DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 15–053 arXiv:1504.07273 April 2015

Constraints on Small-Scale Cosmological Fluctuations from SNe Lensing Dispersion

I. Ben-Dayan

Deutsches Elektronen-Synchrotron DESY, Hamburg

R. Takahashi

Faculty of Science and Technology, Hirosaki University, Hirosaki, Japan

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG