DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 15–055 arXiv:1504.06230 April 2015

Towards Higgs Inflation in the MSSM

T. Terada

Department of Physics, The University of Tokyo, Japan and Deutsches Elektronen-Synchrotron DESY, Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG