DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 15-064 IFJPAN-IV-2015-7 arXiv:1505.02901 May 2015

Towards Three-Loop QCD Corrections to the Time-Like Splitting Functions

O. Gituliar

Institute of Nuclear Physics, Polish Academy of Sciences, Cracow, Poland

S. Moch

II. Institut für Theoretische Physik, Universität Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG