DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 15-073 arXiv:1506.07465 October 2015

Improved Prediction for the Mass of the W Boson in the NMSSM

O. Stål

The Oskar Klein Centre, Department of Physics, Stockholm University, Sweden

G. Weiglein

Deutsches Elektronen-Synchrotron DESY, Hamburg

L. Zeune

ITFA, University of Amsterdam, The Netherlands

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG