DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 15-079 arXiv:1505.07460 May 2015

Resummations and Non-Perturbative Corrections

Y. Hatsuda

Deutsches Elektronen-Synchrotron DESY, Hamburg

K. Okuyama

Department of Physics, Shinshu University, Matsumoto, Japan

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG