DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 15–101 OCU-PHYS 428 arXiv:1507.01678 July 2015

Exact Instanton Expansion of ABJM Partition Function

Y. Hatsuda

Deutsches Elektronen-Synchrotron DESY, Hamburg

S. Moriyama

Department of Physics, Osaka City University, Osaka, Japan

K. Okuyama

Department of Physics, Shinshu University, Matsumoto, Japan

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG