DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 15-106 CALT 2015-032 arXiv:1506.07508 June 2015

Surface Operators and Separation of Variables

E. Frenkel

University of California, Berkeley, USA

S. Gukov

California Institute of Technology, Pasadena, USA and Simons Center for Geometry and Physics, Stony Brook, USA

J. Teschner

Deutsches Elektronen-Synchrotron DESY, Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG