DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 15-121 arXiv:1507.05068 December 2015

Simulating QCD at the Physical Point with N_f = 2 Wilson Twisted Mass Fermions at Maximal Twist

ETM Collaboration

ISSN 0418-9833

PLATANENALLEE 6 - 15738 ZEUTHEN