DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 15–122 CERN-PH-TH-2015-164 KA-TP-16-2015 LPT-Orsay-15-54 RM3-TH/15-11 arXiv:1507.05093 July 2015

Higgs Mass Predictions of Public NMSSM Spectrum Generators

F. Staub et al.

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG