DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 15-142 arXiv:1508.05318 June 2015

Spin Decoherence in Electron Storage Rings – More from a Simple Model

D. P. Barber

Deutsches Elektronen-Synchrotron DESY, Hamburg

K. Heinemann

Department of Mathematics and Statistics, The Univerity of New Mexico, Albuquerque, USA

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG