DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 15-145 arXiv:1508.04383 August 2015

Non-Simplified SUSY:

~τ -Coannihilation at LHC and ILC

M. Berggren, D. Krücker, J. List, I.-A. Melzer-Pellmann, C. Seitz

Deutsches Elektronen-Synchrotron DESY, Hamburg

A. Cakir

Deutsches Elektronen-Synchrotron DESY, Hamburg and Department of Physics, Istanbul Technical University, Turkey

B. Safarzadeh-Samani

Deutsches Elektronen-Synchrotron DESY, Hamburg and IPM, Tehran, Iran

S. Wayand

KIT IEKP, Karlsruhe

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG