DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 15–148 CERN-PH-TH-2015-198 ICTP-SAIFR 15-127 arXiv:1508.06306 August 2015

On the Soft Limit of the Large Scale Structure Power Spectrum: UV Dependence

M Garny

CERN, Geneva, Switzerland

T. Konstandin, L. Sagunski

Deutsches Elektronen-Synchrotron DESY, Hamburg

R. A. Porto

ICTP South American Institute for Fundamental Research, São Paulo, Brazil

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG