DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 15-152 arXiv:1508.06744 August 2015

The Behaviour of the Green Function for the BFKL Pomeron with Running Coupling

H. Kowalski

Deutsches Elektronen-Synchrotron DESY, Hamburg

L. N. Lipatov

Petersburg Nuclear Physics Institute, Gatchina, St. Petersburg, Russia

D. A. Ross

School of Physics and Astronomy, University of Southampton, UK

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG