DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 15-191 arXiv:1510.07562 October 2015

Gamma-Ray Excess and the Minimal Dark Matter Model

M. Duerr

Deutsches Elektronen-Synchrotron DESY, Hamburg

P. Fileviez Pérez, Ju. Smirnov

Particle and Astroparticle Physics Division, Max-Planck-Institut für Kernphysik, Heidelberg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG