DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 15–199 arXiv:1511.00029 November 2015

Designing and Testing Inflationary Models with Bayesian Networks

L. C. Price

McWilliams Center for Cosmology, Department of Physics, Carnegie Mellon University, Pittsburgh, USA and Department of Physics, University of Auckland, New Zealand

H. V. Peiris

Department of Physics and Astronomy, University College London, UK

J. Frazer

Deutsches Elektronen-Synchrotron DESY, Hamburg and Department of Theoretical Physics, University of the Basque Country, UPV/EHU Bilbao, Spain and IKERBASQUE, Basque Foundation for Science, Bilbao, Spain

R. Easther

Department of Physics, University of Auckland, New Zealand

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG