DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 15-240 arXiv:1601.04545 January 2016

Hierarchical vs Degenerate 2HDM: The LHC Run 1 Legacy at the Onset of Run 2

G. C. Dorsch

Department of Physics and Astronomy, University of Sussex, Brighton, UK and Deutsches Elektronen Synchrotron DESY, Hamburg

S. J. Huber, K. Mimasu, J. M. No

Department of Physics and Astronomy, University of Sussex, Brighton, UK

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG