DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 15-250 arXiv:1512.06436 December 2015

Axion Dark Matter in the Post-Inflationary Peccei-Quinn Symmetry Breaking Scenario

A. Ringwald

Deutsches Elektronen-Synchrotron DESY, Hamburg

K. Saikawa

Deutsches Elektronen-Synchrotron DESY, Hamburg and Department of Physics, Tokyo Institute of Technology, Japan

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG