DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 16-004 arXiv:1601.02809 January 2016

Performance and Optimization of Support Vector Machines in High-Energy Physics Classification Problems

M. Ö. Sahin, D. Krücker, I.-A. Melzer-Pellmann

Deutsches Elektronen-Synchrotron DESY, Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG