DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 16–008 arXiv:1601.03699 January 2016

Measurement of the Cross-Section Ratio σ_{ψ(2S)}/σ_{J/ψ(1S)} in Deep Inelastic Exclusive ep Scattering at HERA

ZEUS Collaboration

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG