DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 16-012 arXiv:1601.05937 January 2016

Two-Loop Conformal Generators for Leading-Twist Operators in QCD

V. M. Braun, M. Strohmaier

Institut für Theoretische Physik, Universität Regensburg

A. N. Manashov

II. Institut für Theoretische Physik, Universität Hamburg and Institut für Theoretische Physik, Universität Regensburg

S. Moch

II. Institut für Theoretische Physik, Universität Hamburg

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG