DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 16-025 ADP-16-8/T963 BONN-TH-2016-01 CERN-TH-2016-033 IFIC/16-09 arXiv:1602.05581 February 2016

Precision Tools and Models to Narrow in on the 750 GeV Diphoton Resonance

F. Staub et al.

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG