DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY 16-027 arXiv:1508.05912 April 2016

Alternative Glues for the Production of ATLAS Silicon Strip Modules for the Phase-II Upgrade of the ATLAS Inner Detector

L. Poley

Deutsches Elektronen-Synchrotron DESY, Hamburg and Zeuthen and Humboldt-Universität, Berlin

I. Bloch, C. Friedrich, I.-M. Gregor

Deutsches Elektronen-Synchrotron DESY, Hamburg and Zeuthen

S. Edwards, S. Pyatt, J. Wilson

University of Birmingham, UK

T. Jones

University of Liverpool, UK

H. Lacker, L. Rehnisch, D. Sperlich

Humboldt-Universität, Berlin

ISSN 0418-9833

NOTKESTRASSE 85 - 22607 HAMBURG